0 500 1000 1500 2000 2500 3000 3500 4000 4500 0 2 4 6 8

Time (s)

700 710 720 0 2 4 6

3280 3300 0

2

4

6 0 500 1000 1500 2000 2500 3000 3500 4000 4500 0 2 4 6 8 DGRAID: Measuring Imperfect Placement

Number of Misplaced Blocks (Thousands)