\hypertarget{Util_8cpp}{\section{\-Aiur/src/\-Util.cpp \-File \-Reference}
\label{Util_8cpp}\index{\-Aiur/src/\-Util.\-cpp@{\-Aiur/src/\-Util.\-cpp}}
}
{\ttfamily \#include \char`\"{}\-Util.\-h\char`\"{}}\*
{\ttfamily \#include $<$fstream$>$}\*
{\ttfamily \#include $<$stdarg.\-h$>$}\*
{\ttfamily \#include $<$sys/stat.\-h$>$}\*
\-Include dependency graph for \-Util.\-cpp\-:\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{Util_8cpp__incl}
\end{center}
\end{figure}
\subsection*{\-Functions}
\begin{DoxyCompactItemize}
\item 
void \hyperlink{Util_8cpp_a600f97854086c731103f1f0bed3b92b2}{log} (const char $\ast$text,...)
\end{DoxyCompactItemize}
\subsection*{\-Variables}
\begin{DoxyCompactItemize}
\item 
char \hyperlink{Util_8cpp_a28d4d3d8445e73a696b2d6f7eadabd96}{buffer} \mbox{[}1024\mbox{]}
\end{DoxyCompactItemize}


\subsection{\-Function \-Documentation}
\hypertarget{Util_8cpp_a600f97854086c731103f1f0bed3b92b2}{\index{\-Util.\-cpp@{\-Util.\-cpp}!log@{log}}
\index{log@{log}!Util.cpp@{\-Util.\-cpp}}
\subsubsection[{log}]{\setlength{\rightskip}{0pt plus 5cm}void {\bf log} (
\begin{DoxyParamCaption}
\item[{const char $\ast$}]{text, }
\item[{}]{...}
\end{DoxyParamCaption}
)}}\label{Util_8cpp_a600f97854086c731103f1f0bed3b92b2}


\-Here is the caller graph for this function\-:\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=246pt]{Util_8cpp_a600f97854086c731103f1f0bed3b92b2_icgraph}
\end{center}
\end{figure}




\subsection{\-Variable \-Documentation}
\hypertarget{Util_8cpp_a28d4d3d8445e73a696b2d6f7eadabd96}{\index{\-Util.\-cpp@{\-Util.\-cpp}!buffer@{buffer}}
\index{buffer@{buffer}!Util.cpp@{\-Util.\-cpp}}
\subsubsection[{buffer}]{\setlength{\rightskip}{0pt plus 5cm}char {\bf buffer}\mbox{[}1024\mbox{]}}}\label{Util_8cpp_a28d4d3d8445e73a696b2d6f7eadabd96}
