\hypertarget{classCMesurePrecision}{\section{\-C\-Mesure\-Precision \-Class \-Reference}
\label{classCMesurePrecision}\index{\-C\-Mesure\-Precision@{\-C\-Mesure\-Precision}}
}


{\ttfamily \#include $<$\-Mesure\-Precision.\-h$>$}

\subsection*{\-Public \-Member \-Functions}
\begin{DoxyCompactItemize}
\item 
\hyperlink{classCMesurePrecision_aacdb15666dd96088a931fb52faa7d329}{\-C\-Mesure\-Precision} ()
\item 
virtual \hyperlink{classCMesurePrecision_a102a3c7a5dd3bdc6fb1cf3edfa8caf1d}{$\sim$\-C\-Mesure\-Precision} ()
\item 
bool \hyperlink{classCMesurePrecision_a3e83f8fcd7e3b997c3f67786e579a211}{\-Start} ()
\item 
double \hyperlink{classCMesurePrecision_ad182b8f2cb31d4926463caa89fe55fb9}{\-Get\-Time\-From\-Start} ()
\item 
char $\ast$ \hyperlink{classCMesurePrecision_ab4ac94ac2d249d137c73230c12d7f16a}{\-Get\-Last\-Error} ()
\end{DoxyCompactItemize}


\subsection{\-Constructor \& \-Destructor \-Documentation}
\hypertarget{classCMesurePrecision_aacdb15666dd96088a931fb52faa7d329}{\index{\-C\-Mesure\-Precision@{\-C\-Mesure\-Precision}!\-C\-Mesure\-Precision@{\-C\-Mesure\-Precision}}
\index{\-C\-Mesure\-Precision@{\-C\-Mesure\-Precision}!CMesurePrecision@{\-C\-Mesure\-Precision}}
\subsubsection[{\-C\-Mesure\-Precision}]{\setlength{\rightskip}{0pt plus 5cm}{\bf \-C\-Mesure\-Precision\-::\-C\-Mesure\-Precision} (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
)}}\label{classCMesurePrecision_aacdb15666dd96088a931fb52faa7d329}
\hypertarget{classCMesurePrecision_a102a3c7a5dd3bdc6fb1cf3edfa8caf1d}{\index{\-C\-Mesure\-Precision@{\-C\-Mesure\-Precision}!$\sim$\-C\-Mesure\-Precision@{$\sim$\-C\-Mesure\-Precision}}
\index{$\sim$\-C\-Mesure\-Precision@{$\sim$\-C\-Mesure\-Precision}!CMesurePrecision@{\-C\-Mesure\-Precision}}
\subsubsection[{$\sim$\-C\-Mesure\-Precision}]{\setlength{\rightskip}{0pt plus 5cm}{\bf \-C\-Mesure\-Precision\-::$\sim$\-C\-Mesure\-Precision} (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}virtual\mbox{]}}}}\label{classCMesurePrecision_a102a3c7a5dd3bdc6fb1cf3edfa8caf1d}


\subsection{\-Member \-Function \-Documentation}
\hypertarget{classCMesurePrecision_ab4ac94ac2d249d137c73230c12d7f16a}{\index{\-C\-Mesure\-Precision@{\-C\-Mesure\-Precision}!\-Get\-Last\-Error@{\-Get\-Last\-Error}}
\index{\-Get\-Last\-Error@{\-Get\-Last\-Error}!CMesurePrecision@{\-C\-Mesure\-Precision}}
\subsubsection[{\-Get\-Last\-Error}]{\setlength{\rightskip}{0pt plus 5cm}char $\ast$ {\bf \-C\-Mesure\-Precision\-::\-Get\-Last\-Error} (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
)}}\label{classCMesurePrecision_ab4ac94ac2d249d137c73230c12d7f16a}


\-Here is the caller graph for this function\-:\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{classCMesurePrecision_ab4ac94ac2d249d137c73230c12d7f16a_icgraph}
\end{center}
\end{figure}


\hypertarget{classCMesurePrecision_ad182b8f2cb31d4926463caa89fe55fb9}{\index{\-C\-Mesure\-Precision@{\-C\-Mesure\-Precision}!\-Get\-Time\-From\-Start@{\-Get\-Time\-From\-Start}}
\index{\-Get\-Time\-From\-Start@{\-Get\-Time\-From\-Start}!CMesurePrecision@{\-C\-Mesure\-Precision}}
\subsubsection[{\-Get\-Time\-From\-Start}]{\setlength{\rightskip}{0pt plus 5cm}double {\bf \-C\-Mesure\-Precision\-::\-Get\-Time\-From\-Start} (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
)}}\label{classCMesurePrecision_ad182b8f2cb31d4926463caa89fe55fb9}


\-Here is the call graph for this function\-:\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{classCMesurePrecision_ad182b8f2cb31d4926463caa89fe55fb9_cgraph}
\end{center}
\end{figure}


\hypertarget{classCMesurePrecision_a3e83f8fcd7e3b997c3f67786e579a211}{\index{\-C\-Mesure\-Precision@{\-C\-Mesure\-Precision}!\-Start@{\-Start}}
\index{\-Start@{\-Start}!CMesurePrecision@{\-C\-Mesure\-Precision}}
\subsubsection[{\-Start}]{\setlength{\rightskip}{0pt plus 5cm}bool {\bf \-C\-Mesure\-Precision\-::\-Start} (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
)}}\label{classCMesurePrecision_a3e83f8fcd7e3b997c3f67786e579a211}


\-Here is the call graph for this function\-:\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{classCMesurePrecision_a3e83f8fcd7e3b997c3f67786e579a211_cgraph}
\end{center}
\end{figure}




\-The documentation for this class was generated from the following files\-:\begin{DoxyCompactItemize}
\item 
\-Aiur/include/\hyperlink{MesurePrecision_8h}{\-Mesure\-Precision.\-h}\item 
\-Aiur/src/\hyperlink{MesurePrecision_8cpp}{\-Mesure\-Precision.\-cpp}\end{DoxyCompactItemize}
