\hypertarget{classHydraliskManager}{\section{\-Hydralisk\-Manager \-Class \-Reference}
\label{classHydraliskManager}\index{\-Hydralisk\-Manager@{\-Hydralisk\-Manager}}
}


{\ttfamily \#include $<$\-Hydralisk\-Manager.\-h$>$}



\-Inheritance diagram for \-Hydralisk\-Manager\-:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=212pt]{classHydraliskManager__inherit__graph}
\end{center}
\end{figure}


\-Collaboration diagram for \-Hydralisk\-Manager\-:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=550pt]{classHydraliskManager__coll__graph}
\end{center}
\end{figure}
\subsection*{\-Public \-Member \-Functions}
\begin{DoxyCompactItemize}
\item 
\hyperlink{classHydraliskManager_a14dc55fa57da0fd64d58d5992a518412}{\-Hydralisk\-Manager} ()
\item 
virtual \hyperlink{classHydraliskManager_a43ae2b1d6182f9883f63c761717af49d}{$\sim$\-Hydralisk\-Manager} ()
\item 
void \hyperlink{classHydraliskManager_aa360fc6744841b83b2dbf85931582e89}{execute\-Micro} (const \hyperlink{Common_8h_a8c0363f93a75c9c1af18ed69aed90ddf}{\-Unit\-Vector} \&targets)
\end{DoxyCompactItemize}


\subsection{\-Constructor \& \-Destructor \-Documentation}
\hypertarget{classHydraliskManager_a14dc55fa57da0fd64d58d5992a518412}{\index{\-Hydralisk\-Manager@{\-Hydralisk\-Manager}!\-Hydralisk\-Manager@{\-Hydralisk\-Manager}}
\index{\-Hydralisk\-Manager@{\-Hydralisk\-Manager}!HydraliskManager@{\-Hydralisk\-Manager}}
\subsubsection[{\-Hydralisk\-Manager}]{\setlength{\rightskip}{0pt plus 5cm}{\bf \-Hydralisk\-Manager\-::\-Hydralisk\-Manager} (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
)}}\label{classHydraliskManager_a14dc55fa57da0fd64d58d5992a518412}


\-Here is the call graph for this function\-:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{classHydraliskManager_a14dc55fa57da0fd64d58d5992a518412_cgraph}
\end{center}
\end{figure}


\hypertarget{classHydraliskManager_a43ae2b1d6182f9883f63c761717af49d}{\index{\-Hydralisk\-Manager@{\-Hydralisk\-Manager}!$\sim$\-Hydralisk\-Manager@{$\sim$\-Hydralisk\-Manager}}
\index{$\sim$\-Hydralisk\-Manager@{$\sim$\-Hydralisk\-Manager}!HydraliskManager@{\-Hydralisk\-Manager}}
\subsubsection[{$\sim$\-Hydralisk\-Manager}]{\setlength{\rightskip}{0pt plus 5cm}virtual {\bf \-Hydralisk\-Manager\-::$\sim$\-Hydralisk\-Manager} (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}inline, virtual\mbox{]}}}}\label{classHydraliskManager_a43ae2b1d6182f9883f63c761717af49d}


\subsection{\-Member \-Function \-Documentation}
\hypertarget{classHydraliskManager_aa360fc6744841b83b2dbf85931582e89}{\index{\-Hydralisk\-Manager@{\-Hydralisk\-Manager}!execute\-Micro@{execute\-Micro}}
\index{execute\-Micro@{execute\-Micro}!HydraliskManager@{\-Hydralisk\-Manager}}
\subsubsection[{execute\-Micro}]{\setlength{\rightskip}{0pt plus 5cm}void {\bf \-Hydralisk\-Manager\-::execute\-Micro} (
\begin{DoxyParamCaption}
\item[{const {\bf \-Unit\-Vector} \&}]{targets}
\end{DoxyParamCaption}
)}}\label{classHydraliskManager_aa360fc6744841b83b2dbf85931582e89}


\-Here is the call graph for this function\-:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{classHydraliskManager_aa360fc6744841b83b2dbf85931582e89_cgraph}
\end{center}
\end{figure}




\-The documentation for this class was generated from the following files\-:\begin{DoxyCompactItemize}
\item 
\-U\-Alberta\-Bot\-\_\-src/\-Projects/\-U\-Alberta\-Bot/\-Source/micromanagement/\hyperlink{HydraliskManager_8h}{\-Hydralisk\-Manager.\-h}\item 
\-U\-Alberta\-Bot\-\_\-src/\-Projects/\-U\-Alberta\-Bot/\-Source/micromanagement/\hyperlink{HydraliskManager_8cpp}{\-Hydralisk\-Manager.\-cpp}\end{DoxyCompactItemize}
